                            AUTOMATIC CALCULATION                            
                           ~~~~~~~~~~~~~~~~~~~~~~~                           
   This  mode  works  in  a similar manner to the manual mode but Thermo Calc
supplies the inputs. To start this mode, highlight item 6 and  press  RETURN.
Thermo Calc  will  then  display (and print if enabled) the header and prompt
you for three pieces of information: start, end and interval. For example, If
you want the results for all values from 50 to 100 in steps of 0.5 then enter
50 as the start value, 100 as the end and 0.5 as  the  interval.  Thermo Calc
then interprets your input but does not check for out of range values at this
stage  (see Valid Keyboard Inputs). Thermo Calc then asks you to confirm your
input and, if OK, performs all  the  calculations  automatically,  displaying
(and  printing)  the  results in two columns. It is at this stage that out of
range warnings are issued.
   Because of it's automatic nature, and the fact that any  results  scrolled
off the screen will be lost, it is advisable to  always  enable  the  printer 
option before using this mode; assuming, of course, that you have  a  printer 
connected. 
